1000

1500 2000 2500 3000

0 500

X

Y photoelectrons/PMT

0 25 50 75 100 125 150 175

-5 -4 -3 -2 -1 0 1 2 3 4 5

X - X

mean γ (cm)

Number of Events

σ^x = 1.7mm (a) (b)