0 50 100 150 200 250 300 350 400 450

-100-80 -60 -40 -20 0 20 40 60 80 100

207.6 / 85 Constant 405.5 6.089 Mean 1.044 0.1756 Sigma 15.65 0.1542

(psec)

Δt=16ps(rms) =37ps(FWHM)