0

200

400

600

800

1000

1200

1400

50 50.5 51 51.5 52 52.5 53 53.5 54 54.5 55

202.7 / 29 Constant 1223. Mean 52.73 Sigma .1571

MeV/c

(a) Reconstructed

momentum

Δp/p = 0.3 Ψ (σ) = 0.7 Ψ (FWHM)